\HeaderA{hgug4112aALIAS2PROBE}{Map between Common Gene Symbol Identifiers and Manufacturer Identifiers}{hgug4112aALIAS2PROBE}
\keyword{datasets}{hgug4112aALIAS2PROBE}
\begin{Description}\relax
hgug4112aALIAS is an R object that provides mappings between
common gene symbol identifiers and manufacturer identifiers.
\end{Description}
\begin{Details}\relax
Each gene symbol is mapped to a named vector of manufacturer identifiers. The name
represents the gene symbol and the vector contains all manufacturer identifiers
that are found for that symbol. An \code{NA} is reported for any gene symbol that 
cannot be mapped to any manufacturer identifiers.

This mapping includes ALL gene symbols including those which are already listed 
in the SYMBOL map.  The SYMBOL map is meant to only list official gene symbols, 
while the ALIAS maps are meant to store all used symbols.

Mappings were based on data provided by: Entrez Gene ( ftp://ftp.ncbi.nlm.nih.gov/gene/DATA ) on 2009-Mar11
\end{Details}
\begin{Examples}
\begin{ExampleCode}
    # Convert the object to a list
    xx <- as.list(hgug4112aALIAS2PROBE)
    if(length(xx) > 0){
        # Get the probe identifiers for the first two aliases
        xx[1:2]
        # Get the first one
        xx[[1]]
    }

\end{ExampleCode}
\end{Examples}

