\HeaderA{hgug4112a.db}{Bioconductor annotation data package}{hgug4112a.db}
\aliasA{hgug4112a}{hgug4112a.db}{hgug4112a}
\keyword{datasets}{hgug4112a.db}
\begin{Description}\relax
Welcome to the hgug4112a.db annotation Package.  The purpose of
this package is to provide detailed information about the
hgug4112a platform. This package is updated biannually.

You can learn what objects this package supports with the following command:

\code{ls("package:hgug4112a.db")} 

Each of these objects has their own manual page detailing where
relevant data was obtained along with some examples of how to use it.
\end{Description}
\begin{Examples}
\begin{ExampleCode}
  ls("package:hgug4112a.db")
\end{ExampleCode}
\end{Examples}

